From 75073d0a8478441cc97a6efa10b566c5fb1dac81 Mon Sep 17 00:00:00 2001
From: Colin Watson <cjwatson@debian.org>
Date: Fri, 17 Apr 2020 20:57:17 +0100
Subject: New upstream version 1.4.0

---
 README.adoc | 10 +++++++---
 1 file changed, 7 insertions(+), 3 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index ce8ac1e..f389a83 100644
--- a/README.adoc
+++ b/README.adoc
@@ -31,16 +31,21 @@ is also available.
 
 ==== Releases
 
-The current release of *libfido2* is 1.3.1. Please consult Yubico's
+The current release of *libfido2* is 1.4.0. Please consult Yubico's
 https://developers.yubico.com/libfido2/Releases[release page] for source
 and binary releases.
 
 ==== Ubuntu
 
+  $ sudo apt install software-properties-common
   $ sudo apt-add-repository ppa:yubico/stable
   $ sudo apt update
   $ sudo apt install libfido2-dev
 
+==== MacOS
+
+  $ brew install libfido2
+
 Or from source, on UNIX-like systems:
 
   $ (rm -rf build && mkdir build && cd build && cmake ..)
@@ -51,8 +56,7 @@ Depending on the platform, the PKG_CONFIG_PATH environment variable may need to
 be set.
 
 *libfido2* depends on https://github.com/pjk/libcbor[libcbor] and
-https://github.com/libressl-portable/portable[LibreSSL] (alternatively,
-https://www.openssl.org[OpenSSL] may be used). On Linux, libudev (part of
+https://www.openssl.org[OpenSSL]. On Linux, libudev (part of
 https://www.freedesktop.org/wiki/Software/systemd[systemd]) is also required.
 
 For complete, OS-specific installation instructions, please refer to the
-- 
cgit v1.2.3

