From c923f422b1e455bdd8ec3bdb10d005e3bfbacfe0 Mon Sep 17 00:00:00 2001
From: nicoo <nicoo@debian.org>
Date: Sun, 23 Feb 2020 15:31:16 +0100
Subject: New upstream version 1.3.1

---
 README.adoc | 17 +----------------
 1 file changed, 1 insertion(+), 16 deletions(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 8693417..ce8ac1e 100644
--- a/README.adoc
+++ b/README.adoc
@@ -31,7 +31,7 @@ is also available.
 
 ==== Releases
 
-The current release of *libfido2* is 1.3.0. Please consult Yubico's
+The current release of *libfido2* is 1.3.1. Please consult Yubico's
 https://developers.yubico.com/libfido2/Releases[release page] for source
 and binary releases.
 
@@ -71,18 +71,3 @@ KERNEL=="hidraw*", SUBSYSTEM=="hidraw", \
 On Windows 1903 and newer versions, access to FIDO devices has been restricted
 to applications using the operating system's native API. Use of *libfido2*
 is still possible in privileged applications.
-
-=== OpenSSH Integration
-
-*libfido2* includes middleware allowing https://www.openssh.com[OpenSSH] to
-talk to U2F/FIDO2 devices. Note that server support is required for
-authentication. In a nutshell:
-
-==== Key Generation
-
-  $ ssh-keygen -t [ecdsa-sk|ed25519-sk] -w /path/to/libsk-libfido2.so
-
-==== Authentication
-
-  $ ssh-agent -P /path/to/libsk-libfido2.so
-  $ ssh-add -S /path/to/libsk-libfido2.so
-- 
cgit v1.2.3

